Home Assignment 1

In the table below is a list of accidents that occurred in different chemical plants. Do a literature search on one of these incidents and write a report the focusses on the following aspects:

1. Describe the incident.

2. Describe the specific chemical process (include a flow diagram of the process).

3. Describe how the process was supposed to behave at steady state and which variables were not at steady state as a result of the incident.

Bhopal, India 1984 Basel, Switzerland 1986 Bradford, United Kingdom 1992 Castleford, United Kingdom 1992 Feyzin, France 1966 Flixborough, United Kingdom 1974 Guadalajara, Mexico 1992 Mexico City, Mexico 1984 Seveso, Italy 1976 Texas City, USA 1947

This is a group assignment. Please submit only one copy of the report per group.