ECH 4323: Chemical Process Control EXPERIMENTAL PROTOTYPE

Design and develop a table-top water clock. The project is completely open-ended and any working prototype will be accepted. The prototype must be built from commonly available parts and should not cost more than $30. You are not allowed to buy a kit from a hobby shop.

This is a team assignment and will be graded as follows: Working model 3 points Engineering and Cost Analysis 2 points A feature that ”wows” me 2 bonus points